--
-- This updates a 1.17.2 database to 1.17.3
--
-- Make changes to Filter table
--
alter table Zones add column CheckMethod enum('AlarmedPixels','FilteredPixels','Blobs') NOT NULL default 'Blobs' after AlarmRGB;
alter table Filters drop column MonitorId;
alter table Filters drop index FilterIDX;
--
-- These are optional, but we might as well
--
optimize table Frames;
optimize table Events;
optimize table Filters;
optimize table Zones;
optimize table Monitors;
optimize table Stats;
